Name: testsuite::test_goodhandler - test if SLI returns exit code 0 when an error is handled by a correct user error handler.

Synopsis:

(test_goodhandler) run -&gt;


Description:

This script establishes a user error handler and then provokes an 
error. The error handler resets errodict::newerror to false. This is 
a dumb, but correct way of handling errors. NEST should pass this 
scipt and return exit code 0.


Author:

Ruediger Kupper


FirstVersion:

03-jul-2008


SeeAlso:

testsuite::test_pass
testsuite::test_fail
testsuite::test_stop
testsuite::test_goodhandler
testsuite::test_lazyhandler
testsuite::test_badhandler

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/selftests/test_goodhandler.sli
