Name: testsuite::test_inhomogeneous_poisson_generator - li script to test
inhomogeneous_poisson_generator device

Synopsis:

(test_inhomogeneous_poisson_generator) run


Description:

test_inhomogeneous_poisson_generator checks the 
inhomogeneous_poisson_generator device and its 
consistency with the nest simulation kernel.


Author:

Barna Zajzon


FirstVersion:

December 2017


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_inhomogeneous_poisson_generator.sli
