Name: testsuite::test_min_delay - li script to test whether min_delay is updated correctly

Synopsis:

(test_min_delay) run


Description:

This script tests whether min_delay is updated correctly. It does this by checking 
whether the value is updated correctly in the static_synapse and in the root node.


Author:

Eppler


FirstVersion:

July 2007


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_min_delay.sli
