Name: testsuite::test_multimeter_accu - test support for multimeter accumulation mode

Synopsis:

(test_multimeter_accu.sli) run -&gt; dies if assertion fails


Description:

1. Test that all recording flags incompatible with /to_accumulator are set to false 
2. Simulate iaf_cond_alpha net with poisson input and record detailed and accumulated 
potentials, compare. 
3. Run network for different thread numbers to check accumulation across threads.


Author:

Plesser


FirstVersion:

2011-02-11


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_multimeter_accu.sli
