Name: testsuite::test_multimeter_freeze_thaw - test if multimeter handles frozen nodes properly

Synopsis:

(test_multimeter_freeze_thaw.sli) run -&gt; dies if assertion fails


Description:

1. Record from neuron initially frozen, then thawed, then frozen, then thawed. See 
that correct number of data points collected. 
2. Same as above, simultaneously record from thawed node. 
3. Record from two synchrounsly frozen/thawed nodes in accumulator mode. 
4. Same as above, but one node permanently thawed.


Author:

Plesser


FirstVersion:

2011-02-11


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_multimeter_freeze_thaw.sli
