Name: testsuite::test_multimeter_support - test if multimeter support works in neuron

Synopsis:

(test_multimeter_support.sli) run -&gt; dies if assertion fails


Description:

The script checks all modes providing a "recordables" entry in their status dict. 
It creates a multimeter, sets it to record from all recordables and checks whether 
the correct amount of data is collected. It does not check the content of the data 
collected.


Author:

Plesser


FirstVersion:

2010-10-01


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_multimeter_support.sli
