Name: testsuite::test_multisynapse_models - test properties of multisynapse model

Synopsis:

(test_multisynapse_models) run


Description:

For all models with names ending in _multisynapse, this test checks 
&bull; that the neuron does not accept input to rport 0 
&bull; that the neuron will accept input to rport 1 in default config 
&bull; that it is possible to set tau_syn/E_rev to empty vectors


Author:

Hans Ekkehard Plesser


FirstVersion:

December 2016


SeeAlso:


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_multisynapse_models.sli
