Name: testsuite::test_multithreading_devices - li script to test data collection across thread

Synopsis:

(test_multithreading_devices) run


Description:

This script tests, if data collection across threads is working 
correctly. In particular, the test checks if the events dictionary 
is the same if we run with one or two threads.


Author:

Jochen Martin Eppler


FirstVersion:

May 2010


SeeAlso:

testsuite::test_multithreading

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_multithreading_devices.sli
