Name: testsuite::test_noise_generator - minimal test of noise_generator

Synopsis:

(test_noise_generator) run -&gt; dies if assertion fails


Description:

Tests parameter setting and statistical correctness for one application.


Author:

Plesser


FirstVersion:

July 2008


SeeAlso:

noise_generator

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_noise_generator.sli
