Name: testsuite::test_pass - test if SLI returns exit code 0 after executing a file.

Synopsis:

(test_pass) run -&gt;


Description:

This script contains no commands. It consists only of this 
documentation header. It is used to test if SLI quits with exit code 
0 after executing a file that did not cause errors.


Remarks:

Yes, this script is really meant to contain no commands!


Author:

Ruediger Kupper


FirstVersion:

03-jul-2008


SeeAlso:

testsuite::test_pass
testsuite::test_fail
testsuite::test_stop
testsuite::test_goodhandler
testsuite::test_lazyhandler
testsuite::test_badhandler

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/selftests/test_pass.sli
