Name: testsuite::test_pulsepacket_generator - minimal test of pulsepacket_generator

Synopsis:

(test_pulsepacket_generator) run -&gt; dies if assertion fails


Description:

Tests parameter setting and statistical correctness for one application.


Author:

July 2008, Plesser


SeeAlso:

noise_generator
testsuite::test_poisson_ps_min_interval

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_pulsepacket_generator.sli
