Name: testsuite::test_random_clipped - test clipped random number distribution

Synopsis:

(test_random_clipped.sli) run -&gt; dies if assertion fails


Description:

/normal_clipped is an example of a clipped random number distribution. 
Here we test whether the distribution can be connected to a random 
number generator, it can be parameterized, and the range of the 
resulting random numbers is correct.


Author:

Diesmann


FirstVersion:

100918


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_random_clipped.sli
