Name: testsuite::test_rate_neurons_mpi - Test rate model neurons in parallel

Synopsis:

(test_rate_neurons_mpi) run -&gt; -


Description:

test_rate_neurons_mpi.sli checks if simulations with rate neurons 
(lin_rate_ipn, siegert_neuron) and rate connections 
(rate_connection_instantaneous, diffusion_connection) work in parallel.


Author:

Jan Hahne


SeeAlso:

lin_rate_ipn
rate_connection_instantaneous
siegert_neuron
diffusion_connection

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/mpitests/test_rate_neurons_mpi.sli
