Name: testsuite::test_rdv_param_setting - test parameter setting on RDV

Synopsis:

(test_rdv_param_setting.sli) run -&gt; dies if assertion fails


Description:

Tests that parameters are set properly on RDVs and that exceptions are 
raised if one tries to set unsuitable parameter values. 
This test should be extended for every new RDV.


Author:

Plesser


FirstVersion:

20140402


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_rdv_param_setting.sli
