Name: testsuite::test_set_delay_extrema - li script to test if min_ and max_delay
can be set by the user correctly

Synopsis:

(test_set_delay_extrema) run -&gt; compare output with comments in file


Author:

Diesmann


FirstVersion:

July 2004


SeeAlso:

testsuite::test_iaf_1to2
testsuite::test_iaf_psp
testsuite::test_iaf_dc_aligned_delay

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_set_delay_extrema.sli
