Name: testsuite::test_sli_neuron - test of sli_neuron

Synopsis:

(test_sli_neuron) run -&gt; completes successfully


Description:




Author:

Marc-Oliver Gewaltig


FirstVersion:

January 2009


SeeAlso:

testsuite::test_iaf
sli_neuron

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_sli_neuron.sli
