Name: testsuite::test_spike_det_reset - test if resetting works on spike_detector

Synopsis:

(test_spike_det_reset) run -&gt; dies if assertion fails


Description:

Feeds spike detector with given set of spikes, checks if they 
are recorded properly to memory, then resets, then records a 
few more and checks.


Author:

August 2008, Plesser


SeeAlso:

spike_detector

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_spike_det_reset.sli
