Name: testsuite::test_spike_detector - li script to test spike_detector device

Synopsis:

(test_spike_detector) run


Description:

added more tests


Author:

Sepehr Mahmoudian


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_spike_detector.sli
