Name: testsuite::test_spike_dilutor - test of spike_dilutor functionality

Synopsis:

(test_spike_dilutor) run -&gt; count the average number of spikes repeated by the spike dilutor


Description:

100 spikes are given to spike_dilutor and it has to repeat 20% of them (20 spikes) to 10 different spike detectors. 
If the average number of spikes detected by spike detectors equals to 20 (with marginal error 3), the dilutor works fine.


Author:

Hesam Setareh, April 2015


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_spike_dilutor.sli
