Name: testsuite::test_syn_hom_w - li script for test synapse with homogeneous weight and delay.

Synopsis:

(test_syn_hom_w) run -&gt; compare response with reference data


Description:

Test of the overall function of static_synapse_hom_w. 
A simple integrate-and-fire neuron is created. It is connected to a spike 
generator and a voltmeter by static synapses with homogeneous weight.


Author:

Moritz Helias, Susanne Kunkel


FirstVersion:

April 2008


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_syn_hom_w.sli
