Name: testsuite::test_thread_local_ids - test that thread-local ids are set correctly

Synopsis:

(test_thread_local_ids.sli) run -&gt; dies if assertion fails


Description:

Ensures that thread-local IDs are set correctly on multithreaded simulations.


Author:

Plesser, Ippen


FirstVersion:

2014-11-21


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_thread_local_ids.sli
