Name: testsuite::test_threaded_neuron_device_connections - test for correct creation of neuron-neuron, neuron-device, device-neuron and device-device connections using multiple thread

Synopsis:

(test_threaded_neuron_device_connections) run -&gt; dies if assertion fails


Description:

this script creates connections between neurons and devices and checks whether the actually created connections coincide with the expected connections


Author:

Jakob Jordan


FirstVersion:

January 2016


SeeAlso:


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/issue-211.sli
