Name: testsuite::test_wfr_settings - Tests the possible settings for the waveform relaxation method

Synopsis:

(test_wfr_settings) run -&gt; NEST exits if test fails


Description:

The waveform relaxation method is used for iterative solution when connections 
without delay are present (e.g. gap junctions) 
This test ensures that 
&bull; use_wfr can only be set before nodes are created 
&bull; wfr_comm_interval can only be set greater or equal the resolution and if use_wfr = true 
&bull; setting of use_wfr = false sets wfr_comm_interval to resolution 
&bull; wfr_comm_interval is updated when resolution is changed and use_wfr = false 
&bull; use_wfr is set correctly in created nodes


Author:

Jan Hahne, March 2016


SeeAlso:

testsuite::test_hh_psc_alpha_gap
hh_psc_alpha_gap
gap_junction

Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/unittests/test_wfr_settings.sli
