Name: testsuite::ticket-336-mpi - Check that vp-specific RNGs generate proper random number

Synopsis:

(ticket-336-mpi) run -&gt; NEST exits if test fails


Description:

This test ensures that GetVpRNG, when called on a node with proxies, generates 
the same random number is generated independent of the number of MPI 
processes.


Remarks:

In response to the changes of GetStatus return values (cf #549), 
this test now only checks that the first 10 RNs from its VP-RNG are 
identical independent of the number of MPI processes. 
See also: 
regressiontests/ticket-336-serial.sli


Author:

Hans Ekkehard Plesser, 2010-09-29, 2012-02-16, 2012-02-27, 2012-05-22


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/mpitests/ticket-336-mpi.sli
