Name: testsuite::ticket-386 - ensure all models supporting multimeter work at minimal interval

Synopsis:

(ticket-386.sli) run -&gt; dies if test code crashes


Description:

Due to wrong use of calibrate(), recording from ht_neuron with multimeter 
with interval equal to resolution crashed. This test briefly simulates 
nets with each model supporting multimeter recorded at interval equal to 
resolution.


Author:

Plesser


FirstVersion:

2010-10-03


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-386.sli
