Name: testsuite::ticket-396 - Ensure that the number of threads cannot be changed after resolution.

Synopsis:

(ticket-396) run -&gt; NEST exits if test fails


Description:

This ticket ensures that the number of threads cannot be changed if the resolution 
differs from the default resolution.


Author:

Hans Ekkehard Plesser, 2012-12-03


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-396.sli
