Name: testsuite::ticket-481 - Ensure that poisson_generator_ps delivers spikes to more than one node

Synopsis:

(ticket-481) run -&gt; NEST exits if test fails


Description:

Ensure that poisson_generator_ps delivers spikes to more than one node. 
Peiran Gao reported to nest_bugs that poisson_generator_ps. 
First analysis indicates that spikes are lost if poisson_generator_ps is connected 
to target neurons using different synapse models, even if those are just copies of 
the same underlying class.


Author:

Hans Ekkehard Plesser, 2010-11-03; based on original reproducer by Peiran Gao


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-481.sli
