Name: testsuite::ticket-507 - Ensure that spike_detector throws exception on SetStatus if off-grid times are set

Synopsis:

(ticket-507) run -&gt; NEST exits if test fails


Description:

Ensure that spike_detector throws exception on SetStatus if off-grid times are set, 
unless precise_times is set.


Author:

Hans Ekkehard Plesser, 2011-03-18


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-507.sli
