Name: testsuite::ticket-520 - Ensure that multimeter returns correct number of time points in accumulator mode

Synopsis:

(ticket-520) run -&gt; NEST exits if test fails


Description:

When running in accumulator mode, multimeter must pick up the times array from only one thread, 
so that value and times arrays have the same length.


Author:

Hans Ekkehard Plesser, 2011-06-17


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-520.sli
