Name: testsuite::ticket-673 - Precise models are inconsistent with
respect to whether 1 time step is an acceptable refractory time

Synopsis:

(ticket-673) run -&gt; NEST exits if test fails


Description:

Test whether precise models can handle t_ref==simulation resolution


Author:

Susanne Kunkel, 2013-01-23


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-673.sli
