Name: testsuite::ticket-681 - Ensure that NEST handles errors during node preparation properly

Synopsis:

(ticket-681) run -&gt; NEST exits if test fails


Description:

Ensures that NEST handles errors during calibration gracefully. 
This test will be run only if NEST is compiled without MPI but with Threads.


Author:

Hans E Plesser, 2014-11-25, based on reproducer for #536.


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-681.sli
