Name: testsuite::ticket-710 - HPC synapses do not work for spike detectors.

Synopsis:

(ticket-710) run -&gt; NEST exits if test fails


Description:

Ensure that hpc_synapses work for spike detectors. This test creates 1 neuron and 1 spike detector and tries to connect them.


Author:

Susanne Kunkel, Maximilian Schmidt, 2012-04-08


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-710.sli
