Name: testsuite::ticket-785 - fail_or_die inconsistenly reports error

Synopsis:

(ticket-785) run -&gt; NEST exits if test fails


Description:

Test that fail_or_die reports errors consistently. There are two calls to fail_or_die. The first one passes, the second one fails to pass.


Author:

Marc-Oliver Gewaltig, 2013-12-25


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-785.sli
