Name: testsuite::ticket-800 - Ensure that Topology parameters check their parameter

Synopsis:

(ticket-800) run -&gt; NEST exits if test fails


Description:

This ticket ensures that Topology parameters check their parameters for 
validity, e.g., strictly positive sigma for a Gaussian.


Author:

Hans Ekkehard Plesser, 2014-12-13


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-800.sli
