Name: testsuite::ticket-921 - Ensure rport in synapse defaults is unaffected by Connect

Synopsis:

(ticket-921) run -&gt; NEST exits if test fails


Description:

This ticket ensures that synapse defaults are unaffected if Connect is called with 
a syn_spec containing parameter values, especially that receptor_type is unchanged.


Author:

Hans Ekkehard Plesser, 2014-11-06


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-921.sli
