Name: testsuite::ticket-926 - Ensure stdp_dopamine_synapse does not lead to segfault

Synopsis:

(ticket-926) run -&gt; NEST exits if test fails


Description:

This ticket ensures that stdp_dopamine_synapse does not lead to a segfault, even 
if volume transmitter is not set.


Author:

Hans Ekkehard Plesser, 2014-11-12


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-926.sli
