Name: testsuite::ticket-933 - Ensure that pp_pop_psc_delta generates same results when run in small interval

Synopsis:

(ticket-933) run -&gt; NEST exits if test fails


Description:

This ticket ensures that pp_pop_psc_delta produces the same results when run 10 times 1ms as when 
run 1 time 10ms.


Author:

Hans Ekkehard Plesser, 2014-11-20


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-933.sli
