Name: testsuite::ticket-959 - Ensure that pp_psc_delta generates same results when run in small interval

Synopsis:

(ticket-959) run -&gt; NEST exits if test fails


Description:

This ticket ensures that pp_psc_delta produces the same results when run 1000 times 10ms as when run 1 time 10000ms. This test was adapted from ticket-933.


Author:

Moritz Deger, 2015-03-16


Source:

/var/www/debian/nest/nest-simulator-2.20.0/testsuite/regressiontests/ticket-959.sli
