Name: toc - Return wall clock time elapsed since tic was called.

Synopsis:

toc -&gt; runtime


Description:

Determines the wall clock (real) time elapsed since tic was called 
last, in seconds.  Resolution is given by pclockspersec.


Author:

Hans Ekkehard Plesser


FirstVersion:

2003-07-29


SeeAlso:

tic
realtime
ptimes
pclockspersec
clic
cloc

Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/sli-init.sli
