Name: unittest::exit_test_gracefully - End test script and report it as skipped

Synopsis:

literal exit_test_gracefully -&gt; -


Description:

This function will terminate NEST/SLI with a return code signaling that a 
test was skipped. It should be used to leave test scripts that have special 
prerequisites.


Parameters:

literal - Reason for exit 
Example: 
/unittest using 
is_threaded not { /skipped_no_openmp exit_test_gracefully } if


Source:

/var/www/debian/nest/nest-simulator-2.20.0/lib/sli/unittest.sli
